點擊這個按鈕使所有的設置恢複到最后一次的儲存值。


點擊這個按鈕使所有的設置恢複到出廠原定值。


選擇這個框格比紅、綠、藍色的伽碼連在一起。


使用這個控製來調整紅色伽碼的量


使用這個控製來調整綠色伽碼的量


使用這個控製來調整藍色伽碼的量。


選擇這個框格來保留2個兆的紋路記憶，用于Glide記憶軟件中的紋路對照。若不作此選擇，某些 Glide 游戲可能出現問題。


在 Glide 軟件有足夠的框架緩沖記憶支持時，選擇這個框格來啟動三倍緩沖。這也許能改進顯示性能，單並非所有的軟件 都能使用三倍緩沖，有些可能出現問題。


選擇這個框格來關閉 Glide 屏幕。


選擇這個框格來啟動紋路 mipmap抖動。這可能改進顯示質量，但顯示質量的性能可能降低。


選擇這個框格來強化Direct3D的反別化。 這可能改進顯示質量，而且顯示質量有很少影響或不會降低。


選擇這個框格來啟動交疊模式。


選擇這個框格來允許改動Glide/OpenGL的設置。


選擇這個框格來允許改動Direct3D的設置。


選擇這個框格來允許改動桌面的設置。


紅色伽碼值。


綠色伽碼值。


藍色伽碼值。


點擊向下箭頭來列出下列視頻顯示效果選項︰

- 選擇�正常�將設定視頻的透視性能為最佳。

- 選擇�高�將設定視頻的視覺效果最佳，但可能會降低透視性能。

- 選擇�自動�將自動設置視頻效果，使視覺效果和性能的組合效果最佳。


點擊向下箭頭列出下列alpha配色效果選項︰

- 選擇�更平滑�將使alpha配色透視圖像更柔和。

- 選擇�更靈敏�將使alpha配色透視圖像更詳盡。

- 選擇�自動�將自動調節alpha配色透視效果，使圖像的總體效果最佳。